% testpage.tex - created 25 September 1985
% Copyright (C) 1985 by Leslie Lamport
%
% Test of how accurately printer reproduces dimensions specified
% by LaTeX output.

\documentstyle{article}
\pagestyle{empty}

\oddsidemargin  0pt     
\evensidemargin 0pt
\marginparwidth 1in
\marginparsep 0pt

\topmargin 0pt
\headheight 0pt
\headsep 0pt
\topskip 0pt        

\footheight 0pt
\footskip 0pt
\textheight 9in
\textwidth 6.5in
\setlength{\unitlength}{1in}
\newcounter{foo}
\begin{document}
\parindent 0pt
\begin{picture}(0,0)
\scriptsize
\put(0,-9){\framebox(6.5,9){}}
\multiput(-.1,-4.6)(-.1,0){9}{\line(0,1){.2}}
\multiput(-.05,-4.55)(-.1,0){10}{\line(0,1){.1}}
\setcounter{foo}{1}\multiput(-.1,-4.35)(-.1,0){9}{\makebox
                                 (0,0){\arabic{foo}}\addtocounter{foo}{1}}
\multiput(6.6,-4.6)(.1,0){9}{\line(0,1){.2}}
\multiput(6.55,-4.6)(.1,0){10}{\line(0,1){.1}}
\setcounter{foo}{1}\multiput(6.6,-4.35)(.1,0){9}{\makebox
                                 (0,0){\arabic{foo}}\addtocounter{foo}{1}}
\multiput(3.15,.1)(0,.1){9}{\line(1,0){.2}}
\multiput(3.2,.05)(0,.1){10}{\line(1,0){.1}}
\setcounter{foo}{1}\multiput(3.4,.1)(0,.1){9}{\makebox
                                 (0,0){\arabic{foo}}\addtocounter{foo}{1}}
\multiput(3.15,-9.1)(0,-.1){9}{\line(1,0){.2}}
\multiput(3.2,-9.05)(0,-.1){10}{\line(1,0){.1}}
\setcounter{foo}{1}\multiput(3.4,-9.1)(0,-.1){9}{\makebox
                                 (0,0){\arabic{foo}}\addtocounter{foo}{1}}
\end{picture}
\vfill
\mbox{}\hfill
\begin{minipage}{4in}
The frame on this page should be $6\frac{1}{2}'' \times 9''$.  When
printed on $8\frac{1}{2}'' \times 11''$ paper, the frame should be one
inch from each edge of the paper.\\[10pt]
The rulers at the four edges will indicate how much of the page is
useable.  The large ticks are $.1''$ apart.
\end{minipage}
\hfill\mbox{}

\vfill
\mbox{}
\end{document}

